[GeV]

4ell m

4−10

3−10

2−10

1−10

1

10

[fb / GeV]

4ell /dm 4ell

id^fσd

ATLAS Pythia 8.308 default Pythia 8.308 default-noCR

13000 GeV pp 4-lepton

mcplots.cern.ch [arXiv:1306.3436] 2.8M events ≥ Rivet 3.1.10,

ATLAS_2019_I1720442

(4l) (atlas2019-4lline) m

0 500 1000 [GeV]

4ell m

1

Ratio to ATLAS

2

0.5

2

0.5

1