|η|

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

0.005

[mb] |ηd| dN # > AA,m <T 1 # N 1#

ATLAS

2760 GeV PbPb Heavy Ion minbias

mcplots.cern.ch [arXiv:2401.10621]

(ATLAS_2015_I1360290)

< 7.7 GeV, Centrality: 10-20 pct. T 6.7 < p

0 0.5 1 1.5 2 |η|

1

Ratio to ATLAS

2

0.5

2

0.5

1