1

10

210

310

410

510

610

710

Pythia 8.315 default

5020 GeV PbPb Heavy Ion minbias

mcplots.cern.ch [arXiv:2401.10621] Rivet 4.1.0, 1.7M events

(ALICE_2021_I1946131)

(alice2021-charm)

hi.dp.pt

0 20 40

1

Ratio to Pythia 8.315 default

2

0.5

2

0.5

1