px

0

0.2

0.4

0.6

0.8

1

1.2

p /dx σ d σ1/

DELPHI

Pythia 8.307 eetherm

91.2 GeV ee */Z (Hadronic) γ

mcplots.cern.ch [arXiv:2401.10621] Rivet 4.1.0, 100k events

(DELPHI_1995_I394716)

pm(1385) scaled momentum #Σ

0.1 0.2 0.3 px

1

Ratio to DELPHI

2

0.5

2

0.5

1