[GeV] sqrt{s}

10 15 20 25 30 35 40 45 50

[mb]

elastic σ

TOTEM Pythia 6.428 370 Pythia 6.428 373 Pythia 6.428 374 Pythia 6.428 375 Pythia 6.428 381 Pythia 6.428 382

7000 GeV pp Elastic

mcplots.cern.ch [arXiv:1306.3436] 2.7M events ≥ Rivet 3.1.10,

TOTEM_2012_I1220862

6999.5 7000 7000.5 [GeV] sqrt{s}

1

Ratio to TOTEM

2

0.5

2

0.5

1