[GeV]

}_{12} sqrt{d

ATLAS_2012_I1094564

< 600, |y| < 2.0) T (1.0), 500< p T (anti-k 12d Splitting scale

0 50 100 [GeV]

}_{12} sqrt{d

1

Ratio to ATLAS

2

0.5

2

0.5

1