3η

510

610

710

[pb] 3η/dσd

CMS Pythia 8.308 default Pythia 8.308 tune-AU2 Pythia 8.308 tune-AU2lox Pythia 8.308 tune-AU2loxx Pythia 8.308 tune-AU2m

13000 GeV pp Jets

mcplots.cern.ch [arXiv:1306.3436] 2.4M events ≥ Rivet 3.1.10,

CMS_2021_I1932460

(CMS 4-jets) jη

4− 2− 0 2 4 3η

1

Ratio to CMS

2

0.5

2

0.5

1