Width

0

5

10

15

20

25

1/Ncdot dN/dW

ATLAS Pythia 8.308 default Pythia 8.308 tune-A14-CTEQL1 Pythia 8.308 tune-A14-MSTW2008LO Pythia 8.308 tune-A14-NNPDF2.3LO Pythia 8.308 tune-CUETP8S1

7000 GeV pp Jets