width

0

500

1000

1500

2000

2500 mathrm d lambda T mathrm d p

N^2 mathrm d T mathrm d N / mathrm d p 1

CMS Pythia 8.308 default Pythia 8.308 tune-1 Pythia 8.308 tune-2c Pythia 8.308 tune-2m

13000 GeV pp Jets

mcplots.cern.ch [arXiv:1306.3436] 2.2M events ≥ Rivet 3.1.10,

CMS_2021_I1920187

(CMS jet substructure) 1_1 λ Width

0 0.5 1 width

1

Ratio to CMS

2

0.5

2

0.5

1