[rad]

rm min rm 3j ϕΔ

1−

Rivet 3.1.10,

CMS_2021_I1932460

(jj) (CMS 4-jets) ϕΔ

0 1 2 3 [rad]

rm min rm 3j ϕΔ

1

Ratio to CMS

2

0.5

2

0.5

1