[GeV] Tp

1−10

1

10

210

) [mb/(GeV)] T X) / (dydp 0 S (pprightarrowK σ^2d

LHCB Pythia 6.428 345 Pythia 6.428 346 Pythia 6.428 370 Pythia 6.428 default Pythia 8.308 default

900 GeV pp Soft QCD

mcplots.cern.ch [arXiv:1306.3436] 2.6M events ≥ Rivet 3.1.10,

LHCB_2010_S8758301

) (2.5 < y < 4.0) -(K pT

0 0.5 1 1.5 [GeV] Tp

1

Ratio to LHCB

2

0.5

2

0.5

1