[GeV] Tp

CMS_2013_I1261026

<50) ch |<1.9, 30<N jη >5 GeV, | j T(p _T

Jet p

10 20 30 40 [GeV] Tp

1

Ratio to CMS

2

0.5

2

0.5

1