[GeV] Tp

4

LHCF_2012_I1115479

< 0.6 GeV) T ) (9.6 < |y| < 10.0, p

0π(pT

0 0.1 0.2 0.3 0.4 [GeV] Tp

1

Ratio to LHCF

2

0.5

2

0.5

1