[GeV]

T EΣ

5−10

4−10

3−10

2−10

1−10

1

10

210

]^{-1} [mb,GeV T /dsum E σd

UA1 Pythia 6.428 370 Pythia 6.428 default Pythia 8.308 default

200 GeV ppbar Soft QCD

mcplots.cern.ch [arXiv:1306.3436] 2.7M events ≥ Rivet 3.1.10,

UA1_1990_S2044935

)_T

(UA1, all p

Sum ET

0 20 40 60 [GeV]

T EΣ

1

Ratio to UA1

2

0.5

2

0.5

1