|y| Λ

0.05

0.1

0.15

0.2

0.25

) dN/dy NSD (1/N

CMS Pythia 6.428 370 Pythia 6.428 373 Pythia 6.428 374 Pythia 6.428 375 Pythia 6.428 381 Pythia 6.428 382

900 GeV pp NSD

mcplots.cern.ch [arXiv:1306.3436] 2.3M events ≥ Rivet 3.1.10,

CMS_2011_S8978280

) (NSD, |y| < 2)

Λ(|y|

0 0.5 1 1.5 2 |y| Λ

1

Ratio to CMS

2

0.5

2

0.5

1