M(4l) (GeV)

4−10

3−10

2−10

1−10

1

/dM (fb/GeV) σ d

ATLAS Pythia 8.315 default Pythia 8.315 default-noFsr Pythia 8.315 default-noRap

13000 GeV pp 4-lepton

mcplots.cern.ch [arXiv:2401.10621]