LHA

2−10

1−10

1

10

210

} {d LHA σd #d σ 1 #d

ATLAS

13000 GeV pp Top

mcplots.cern.ch [arXiv:2401.10621]

(ATLAS_2019_I1724098)

W selection, trimmed

0.2 0.4 0.6 LHA

1

Ratio to ATLAS

2

0.5

2

0.5

1