[rad] μe ϕΔ Dilepton

0

0.2

0.4

0.6

0.8

1

1.2

[1/rad] μe ϕΔ / d σ d σ 1 /

ATLAS Pythia 8.315 default Pythia 8.315 vincia-default

13000 GeV pp tt