] )[{Radian}

}{t,({t} ϕΔ

1−10

1

10

]^{-1} [{Radian}

)}}{t, ({tϕΔd σd #σ1#

CMS Pythia 6.428 350 Pythia 6.428 357 Pythia 6.428 358 Pythia 6.428 359

13000 GeV pp tt

mcplots.cern.ch [arXiv:2401.10621]