|^μη |

0 20 40 60 80 100 120 140 160

|^μη ) / d|

±

(2010) * + D ±(W σ d

CMS Herwig++ 2.7.1 default Herwig 7.2.1 default Pythia 8.315 default Pythia 8.315 vincia-default

13000 GeV pp W

mcplots.cern.ch [arXiv:2401.10621] 3.7M events ≥ Rivet 4.1.0,

(CMS_2019_I1705068)

±

(2010) * + D ± CMS, sqrt(s) = 13 TeV, W

0 0.5 1 1.5 2 |^μη |

1

Ratio to CMS

2

0.5

2

0.5

1