μem

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4

μe /d m σd

ATLAS

13000 GeV pp WW

mcplots.cern.ch [arXiv:2401.10621]

(ATLAS_2021_I1852328)

>200 GeV j T j, p νν

±

μ^± e → pp

200 400 600 μem

1

Ratio to ATLAS

2

0.5

2

0.5

1