|^Z|y

0

100

200

300

400

500

600

700

800

| [pb] Z /d|y σd

CMS Pythia 8.315 qcdcr0qq1

13000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:2401.10621] Rivet 4.1.0, 4.5M events

(CMS_2019_I1753680)

-μ ^+μ→

CMS, 13 TeV, Z

0 0.5 1 1.5 2 |^Z|y

1

Ratio to CMS

2

0.5

2

0.5

1