30 40 50 60 70 80 90 100 110 120 Pythia 8.315 default Pythia 8.315 tune-2c Pythia 8.315 tune-2m

2760 GeV pp Soft QCD

mcplots.cern.ch [arXiv:2401.10621] 3.7M events ≥ Rivet 4.1.0,

(ALICE_2012_I1181770)

2759.5 2760 2760.5

1

Ratio to Pythia 8.315 default

2

0.5

2

0.5

1