η#b

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18

)η (#b _2ηF

CMS Pythia 6.428 350 Pythia 6.428 370 Pythia 6.428 380 Pythia 6.428 p0 Pythia 6.428 p2010

7000 GeV pp Jets

mcplots.cern.ch [arXiv:2401.10621] 3.1M events ≥ Rivet 4.1.0,

(CMS_2013_I1265659)

_2| < 2.5 η = 7 TeV, jet 2--3 correlation, 0.8 < | s CMS,

0 1 2 3 η#b

1

Ratio to CMS

2

0.5

2

0.5

1