} {dijet χ

0.04

0.06

0.08

0.1

0.12

0.14

} {dijet

χ/d}

{dijet

σ d}

{dijet σ1/

CMS Pythia 8.315 default Pythia 8.315 tune-A14-CTEQL1 Pythia 8.315 tune-A14-MSTW2008LO Pythia 8.315 tune-A14-NNPDF2.3LO Pythia 8.315 tune-CUETP8S1