[GeV] 12m

0

10

20

30

40

50

60

| [pb/GeV] max /dm d|y σ^2d

ATLAS Herwig 7.2.1 default Pythia 8.315 default

7000 GeV pp Jets

mcplots.cern.ch [arXiv:2401.10621] 3.2M events ≥ Rivet 4.1.0,

(ATLAS_2010_I871366)

|<2.8. anti-KT, R=0.4. max Dijet mass spectrum for 2.1<|y

1000 1200 1400 1600 [GeV] 12m

1

Ratio to ATLAS

2

0.5

2

0.5

1