chN

5−10

4−10

3−10

2−10

1−10

1

Charged jet rate

CMS Herwig 7.2.1 default Pythia 8.315 default

7000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:2401.10621] 100k events≥

Rivet 4.1.0,

(CMS_2013_I1261026)

| < 1.9

ch.jet η > 30 GeV, | T ch.jet

Charged jet rate, p

0 50 100 chN

1

Ratio to CMS

2

0.5

2

0.5

1