4−10

3−10

2−10

1−10

1

ATLAS Pythia 6.428 370 Pythia 6.428 373 Pythia 6.428 374 Pythia 6.428 375 Pythia 6.428 381 Pythia 6.428 382

7000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:2401.10621] 100k events≥

Rivet 4.1.0,

(ATLAS_2012_I1183818)

| < 0.8 η for the minimum bias selection, 0.0 < | T E∑

0 20 40 60

1

Ratio to ATLAS

2

0.5

2

0.5

1