|y|^-Ξ

0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

0.045

) dN/dy NSD (1/N

CMS Herwig 7.1.6 softTune

7000 GeV pp NSD

mcplots.cern.ch [arXiv:2401.10621] Rivet 4.1.0, 1M events

(CMS_2011_I890166)

= 7 TeV s rapidity distribution at -Ξ

0 0.5 1 1.5 2 |y|^-Ξ

1

Ratio to CMS

2

0.5

2

0.5

1