[rad] ϕΔ

6−10

5−10

4−10

3−10

2−10

1−10 1 10 210

]^{-1} [rad ϕΔd σd# σ 1#

CMS Pythia 6.428 370 Pythia 6.428 391 Pythia 6.428 default Pythia 6.428 pro-q2o

8000 GeV pp Jets

mcplots.cern.ch [arXiv:2401.10621] 2.8M events ≥ Rivet 4.1.0,

(CMS_2016_I1421646)

<700 GeV

leading T CMS, 8 TeV, Di-jet azimuthal decorrel., 500<p

0 1 2 3 [rad] ϕΔ

1

Ratio to CMS

2

0.5

2

0.5

1