tt Tp

0.03 − 0.02 − 0.01 − 0 0.01

0.02

0.03

0.04

0.05

}_{{C}}^{{lep} A

CMS Pythia 8.315 default Pythia 8.315 tune-AU2 Pythia 8.315 tune-AU2lox Pythia 8.315 tune-AU2loxx Pythia 8.315 tune-AU2m

8000 GeV pp tt

mcplots.cern.ch [arXiv:2401.10621] 3.8M events ≥ Rivet 4.1.0,

(CMS_2016_I1430892)

dilepton channel, parton-level }t CMS, 8 TeV, {t

0 100 200 300_{tt} Tp

1

Ratio to CMS

2

0.5

2

0.5

1