[GeV] s

0

2

4

6

8

10

12

14

16

[mb] DDσ

ALICE Pythia 8.315 default Pythia 8.315 tune-A14-CTEQL1 Pythia 8.315 tune-A14-MSTW2008LO Pythia 8.315 tune-A14-NNPDF2.3LO Pythia 8.315 tune-CUETP8S1

900:2760:7000 GeV pp Soft QCD

mcplots.cern.ch [arXiv:2401.10621]

(ALICE_2012_I1181770)

> 3 ηΔ Double diffraction cross-section for

1000 1500 2000 2500 [GeV] s

1

Ratio to ALICE

2

0.5

2

0.5

1