[{GeV / } Tp

0

0.5

1

1.5

2

2.5

3

RAA

ALICE Pythia 8.315 default

2760 GeV ppPbPb Heavy Ion minbias

mcplots.cern.ch [arXiv:2401.10621]

(ALICE_2012_I1127497)

= {2.76 TeV} NNs =60-70 #%,

, {Centr} T RAA vs. p

0 20 40 c] [{GeV / } Tp

1

Ratio to ALICE

2

0.5

2

0.5

1