) / GeV

({leading jet} Tp

1

≥ Rivet 4.1.0,

(CDF_2010_I849042)

density T p∑ TransMAX region charged

0 100 200 300 400 ) / GeV

({leading jet} Tp

1

Ratio to CDF

2

0.5

2

0.5

1