(Z) [GeV] Tp

5−10

4−10

3−10

2−10

1−10

1

10 210

(Z) [pb/GeV] T /dp σd

D0 Pythia 6.428 345 Pythia 6.428 346 Pythia 6.428 370 Pythia 6.428 default Pythia 8.315 default

1960 GeV ppbar Z (Drell-Yan)

mcplots.cern.ch [arXiv:2401.10621] 3.6M events ≥ Rivet 4.1.0,

(D0_2010_I856972)

(unnormalised) T Z boson p

0 100 200 300 (Z) [GeV] Tp

1

Ratio to D0

2

0.5

2

0.5

1