chn

4−10

3−10

2−

≥ Rivet 4.1.0,

(UA1_1990_I280412)

= 900 {GeV} s Multiplicity distribution at

0 20 40 60 80 chn

1

Ratio to UA1

2

0.5

2

0.5

1