pTD2 (charged-only)

0 5000

Rivet 3.1.10,

CMS_2021_I1920187

(charged only) (CMS jet substructure) 2_0 λ ^2)_T^D(p

0 0.5 1 pTD2 (charged-only)

1

Ratio to CMS

2

0.5

2

0.5

1