23 R Δ

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016 j2N j3N

CMS Pythia 6.428 345 Pythia 6.428 346 Pythia 6.428 370 Pythia 6.428 ambt1 Pythia 6.428 z1 Pythia 6.428 z2

8000 GeV pp Z+Jet

mcplots.cern.ch [arXiv:1306.3436] 2.3M events ≥ Rivet 3.1.10,

CMS_2021_I1847230

(jets) (CMS 3j and Z+2j) R Δ

0.5 1 1.5 23 R Δ

1

Ratio to CMS

2

0.5

2

0.5

1