[GeV] Z Tp

3−10

2−10

1−10

1

10

[1/GeV] Z T /dp σ dσ1/

CMS Herwig++ 2.7.1 default Herwig++ 2.7.1 UE-EE-5 Herwig 7.2.1 default

13000 GeV pp Z+Jet

mcplots.cern.ch [arXiv:1306.3436] 2.7M events ≥ Rivet 3.1.10,

CMS_2020_I1837084

)νν→ (CMS Z

ll_Tp

500 1000 1500 [GeV] Z Tp

1

Ratio to CMS

2

0.5

2

0.5

1