|_{ellell} ηΔ|

4−10

ATLAS_2016_I1467454

< 300 GeV) ll (ll) (200 < m ηΔ

0 1 2 3 |_{ellell} ηΔ|

1

Ratio to ATLAS

2

0.5

2

0.5

1