|^Z|y

0 100 200 300 400 500 600 700 800

| [pb] Z /d|y σd

CMS

13000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:1306.3436]

(CMS_2019_I1753680)

(CMS Z production) lly

0 0.5 1 1.5 2 |^Z|y

1

Ratio to CMS

2

0.5

2

0.5

1