ϕ dη/d_T

Mean p

0

0.2

0.4

0.6

0.8

1

-1 [GeV] T /d mean p ev dN ev 1/N

ATLAS Pythia 8.308 default Pythia 8.308 tune-AU2 Pythia 8.308 tune-AU2lox Pythia 8.308 tune-AU2loxx Pythia 8.308 tune-AU2m

13000 GeV pp Z (Drell-Yan)