(ellell) [GeV] Tp

0

0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

Z peak region → Ratio

CMS Pythia 8.308 default Pythia 8.308 default-noCR

13000 GeV pp Z (Drell-Yan)

mcplots.cern.ch [arXiv:1306.3436] 100k events≥

Rivet 3.1.10,

CMS_2022_I2079374

(Z) ratio (CMS Drell--Yan) pT

10^210^310 (ellell) [GeV] Tp

1

Ratio to CMS

2

0.5

2

0.5

1